BHAM-HEP/96-02 5 August 1996

Review of Vcb Measurements

M.P. Jimack PPARC Advanced Fellow

Abstract

A review of measurements of the CKM matrix element, Vcb, performed both at LEP and at the Υ(4S) is presented. By averaging results from inclusive semileptonic B decays and from B → D^�ℓν decays (using the zero recoil technique), |Vcb| is determined :

|Vcb| = 0.0395 ± 0.0020 .

Invited talk at the III German-Russian Workshop on Theoretical Progress in Heavy Quark Physics, Dubna, 20-22 May 1996.